---
title: "Qwen3 support is now more reliable."
version: 0.5.17
description: "Jan v0.5.17 is out: Qwen3 support is now more reliable"
date: 2025-05-14
ogImage: "/assets/images/changelog/jan-v0-5-17-gemm3-patch.gif"
---

import ChangelogHeader from "@/components/Changelog/ChangelogHeader"

<ChangelogHeader title="Qwen3 support is now more reliable" date="2025-05-14" ogImage="/assets/images/changelog/jan-v0-5-17-gemm3-patch.gif" />

👋 Jan v0.5.17 is out: Qwen3 support is now more reliable

## Highlights 🎉

- Improved Qwen3 support with cleaner token output
- Clearer install and quickstart docs
- UI polish and bug fixes throughout

Update your Jan or [download the latest](https://jan.ai/).

For more details, see the [GitHub release notes](https://github.com/menloresearch/jan/releases/tag/v0.5.17).
