---
title: "Jan v0.5.10 is live"
version: 0.5.10
description: "Jan is faster, smoother, and more reliable."
date: 2024-12-03
ogImage: "https://catalog.jan.ai/docs/jan-v0.5.10.gif"
---

import ChangelogHeader from "@/components/Changelog/ChangelogHeader"

<ChangelogHeader title= "Jan v0.5.10: Jan is faster, smoother, and more reliable." date="2024-12-03" ogImage= "https://catalog.jan.ai/docs/jan-v0.5.10.gif"  />

Jan v0.5.10 is live: Jan is faster, smoother, and more reliable.

### Highlights 🎉 

- Resolved model startup issues, memory leaks, and improved token limits
- Clearer error messages and subtle UX improvements

Update your product or download the latest: https://jan.ai

For more details, see the [GitHub release notes](https://github.com/menloresearch/jan/releases/tag/v0.5.10).